卡卡湾厅

市场羁系总局宣布一批质量手艺帮扶典范案例

泉源：快科技

2025-08-07 07:28:14

99er热视频,
一、浙江省台州市市场羁系局助力雪地靴工业提质升级

帮扶配景：雪地靴工业是台州市的特色工业之一 ，， ，，， ，台州拥有生产企业120余家 ，， ，，， ，年产量5000万双 ，， ，，， ，总产值超15亿元 ，， ，，， ，占天下市场份额的三分之一。。。。 。随着工业扩张生长 ，， ，，， ，一些问题日益凸显 ，， ，，， ，部分中小微企业质量治理基础薄弱 ，， ，，， ，产品标准执行杂乱 ，， ，，， ，同质化竞争显着；；；；；地方专业检测能力匮乏 ，， ，，， ，企业送检本钱高、周期长 ，， ，，， ，制约产品品质提升与市场信誉。。。。 。面临消耗升级趋势及日益强烈的市场竞争 ，， ，，， ，古板生长模式难以为继 ，， ，，， ，工业整体升级迫在眉睫。。。。 。

帮扶行动：台州市市场羁系局精准切脉工业痛点 ，， ，，， ，制订《工业集群产品质量提升实验计划》 ，， ，，， ，以“优效劳、强羁系、提质量”为焦点思绪 ，， ，，， ，打出一套质量手艺帮扶“组合拳”。。。。 。一是构建分级分类羁系系统。。。。 。多维度收罗产品质量信息 ，， ，，， ，科学评定企业质量信用品级 ，， ，，， ，接纳“靶向羁系+正向指导”方法 ，， ，，， ，对高信用企业降低羁系频次 ，， ，，， ，对高危害企业开展靶向性专项整治。。。。 。二是强化标准宣贯赋能。。。。 ？？？？埂把┑匮スひ抵柿孔ㄏ钆嘌祷帷毕盗谢疃 ，， ，，， ，约请手艺专家解读防滑性能、帮面材质、保暖要求等要害指标及检测要领 ，， ，，， ，针对性提出质量刷新步伐 ，， ，，， ，培训企业认真人与质检职员100多人次。。。。 。三是强化监视抽查效果运用。。。。 。建设“质量警示展台” ，， ，，， ，果真曝光抽检缺乏格产品及企业 ，， ，，， ，并针对性开展“一对一”手艺帮扶 ，， ，，， ，打造“抽检+帮扶+整改”事情模式 ，， ，，， ，资助企业精准对标达标 ，， ，，， ，提升产品质量。。。。 。四是强链补链补齐工业检测能力短板。。。。 。联合磨练认证机构、行业协会打造雪地靴检测共享实验室 ，， ，，， ，共享防滑性能测试仪、耐折试验机等专业装备。。。。 。共享实验室自今年6月运行以来 ，， ，，， ，已开展检测效劳53次 ，， ，，， ，为企业节约检测本钱7万余元。。。。 。

帮扶效果：通过帮扶 ，， ，，， ，已有18家企业通过小微企业质量治理系统认证 ，， ，，， ，人均产量提升至15.8件/小时 ，， ，，， ，产品一次性过检及格率从60%跃升至95% ，， ，，， ，订单量增添30%。。。。 。今年上半年 ，， ，，， ，区域工业整体产值同比增添15%。。。。 。

二、重庆市市场羁系局立异构建四个“一体帮扶”助力“重庆造”电 动摩托车“提质强链出海”

帮扶配景：摩托车工业是重庆市制造业支柱工业之一 ，， ，，， ，2024年重庆市摩托车整车出口502.7万辆 ，， ，，， ，占天下摩托车整车出口量的34.7%。。。。 。电动摩托车是重庆市摩托车工业转型升级的重点偏向 ，， ，，， ，全市正立异打造高端摩托车千亿级特色优势工业集群。。。。 。重庆市市场羁系局自动施展职能优势 ，， ，，， ，启动全市电动摩托车工业“提质强链出海”事情 ，， ，，， ，资助企业增强质量竞争力及出海能力。。。。 。

帮扶步伐：一是立异构建综合帮扶系统。。。。 。增强帮扶资源整合运用 ，， ，，， ，建设质量、标准、认证、磨练检测等要素集成的综合帮扶系统 ，， ，，， ，为电动摩托车生产企业提供四个“一体帮扶” ，， ，，， ，即“整车厂与供应链一体帮扶”“内销产品与出口产品一体帮扶”“历程控制与职员能力一体帮扶”以及“标准切合性与质量可靠性一体帮扶”。。。。 。二是精准掌握企业帮扶需求。。。。 ？？？？怪柿渴忠瞻锓觥澳愕阄野铩被疃 ，， ，，， ，约请雅迪、爱玛、宗申等电动摩托车生产企业加入质量手艺帮扶座谈会 ，， ，，， ，网络帮扶需求 ，， ，，， ，做到问需精准帮扶。。。。 。三是有用解决区域产品质量问题。。。。 。召开电动摩托车质量提升剖析会 ，， ，，， ，对《电动摩托车和电动轻盈摩托车清静要求》等标准举行专业解读 ，， ，，， ，连系电磁兼容(EMC)等典范质量问题案例提出整改战略。。。。 。协同手艺机构延伸效劳链条 ，， ，，， ，一体周全发动供应链质量帮扶 ，， ，，， ，培育区域质量生长较量优势。。。。 。四是效劳企业提升“出海”能力。。。。 ？？？？构适谐『瞎孀既肱嘌 ，， ，，， ，解说外洋市场准入规则系统和测试流程 ，， ，，， ，资助出口企业掌握国际市场合规准入动态 ，， ，，， ，妥善应敌手艺商业壁垒。。。。 。五是提升产品出厂磨练检测能力。。。。 。组织生产企业磨练职员到手艺机构免费实操培训、追随学习 ，， ，，， ，发动提升企业产品出厂磨练水平。。。。 。

帮扶效果：阻止现在 ，， ，，， ，“提质强链出海”事情已笼罩全市29家电动摩托车整车生产企业 ，， ，，， ，网络企业帮扶需求48条 ，， ，，， ，培训企业手艺职员80余人 ，， ，，， ，开设电机及控制器、电磁兼容性等学习项目44项。。。。 。协同手艺机构准备开展针对西欧、东南亚等主要出口目的地国家的合规准入培训 ，， ，，， ，推动建设电动摩托车领域产品质量可靠性立异公共效劳平台 ，， ，，， ，增进提升“重庆造”电动摩托车的影响力和美誉度。。。。 。

三、山东省滨州市市场羁系局赋能商用厨具工业提质增效

帮扶配景：商用厨具工业是滨州市的富民工业 ，， ，，， ，现有生产及配套企业2800余家 ，， ，，， ，产品涵盖十二大系列、上千品种 ，， ，，， ，产销量年均增添15%以上 ，， ，，， ，占全省90.6%、天下42.5%的市场份额 ，， ，，， ，笼罩天下及60多个国家和地区。。。。 。近年来 ，， ，，， ，行业内低价、同质化等“内卷式”竞争凸显 ，， ，，， ，产品质量水平狼籍不齐、企业立异能力缺乏等问题恒久保存 ，， ，，， ，影响了工业康健生长。。。。 。

帮扶行动：一是以培训提升治理能力。。。。 。举行厨具企业质量、标准、认证等宣贯和培训聚会30余场 ，， ，，， ，全方位提升企业质量意识和治理水平。。。。 。二是以奖补增进认证意愿。。。。 。制订专项激励政策 ，， ，，， ，资助90余家加入自愿性认证的厨具企业获得资金津贴 ，， ，，， ，勉励企业加速完成燃气燃烧用具等焦点产品3C认证 ，， ，，， ，推动更多企业实现质量标准与国际接轨。。。。 。三是以检查催促整改问题。。。。 。针对抽查缺乏格企业、涉舆情和投诉举报多的企业 ，， ，，， ，开展重点检查和专家问诊 ，， ，，， ，坚持每年组织专家检查企业50家以上 ，， ，，， ，借助手艺专家实力 ，， ，，， ，“一对一”资助企业整改问题。。。。 。

帮扶效果：通过帮扶 ，， ，，， ，外地商用厨具行业治理水平和质量状态显着改善 ，， ，，， ，产品质量监视抽查及格率同比提高15% ，， ，，， ，质量违法案件同比下降12%。。。。 。179家燃气燃烧用具生产企业获得CCC证书745张 ，， ，，， ，企业获证率位居天下前线。。。。 。标准话语权进一步提升 ，， ，，， ，主导宣布整体标准17项 ，， ，，， ，企业加入制修订国标23项。。。。 。拥有有用专利1268件 ，， ，，， ，其中发明专利46件 ，， ，，， ，马德里国际注册商标12件 ，， ，，， ，著名商标1件。。。。 。促成商用厨具企业完成知识产权质押融资32笔 ，， ，，， ，融资额达1.7亿元。。。。 。

四、福建省厦门市市场羁系局帮帮助力储能电池工业质量提升

帮扶配景：储能电池工业是厦门市四大战略性新兴工业之一。。。。 。近年来 ，， ，，， ，厦门市储能电池工业快速生长 ，， ，，， ，已形成具有一定规模效应的工业集群 ，， ，，， ，但仍保存质量治理系统不健全、中小企业工艺标准化水平低、行业企业在储能及相关领域的标准话语权不高等问题 ，， ，，， ，一定水平上制约了工业高质量生长。。。。 。

帮扶行动：一是强化质量支持。。。。 ？？？？构ひ抵柿课收 ，， ，，， ，制订工业质量瓶颈图谱 ，， ，，， ，形成“质量问题”“重点攻关项目”等清单 ，， ，，， ，梳理质量问题151项。。。。 。建设质量攻关“揭榜挂帅”机制 ，， ，，， ，向企业派驻质量效劳专员 ，， ，，， ，按月跟踪质量提升希望 ，， ，，， ，按季评估质量手艺帮扶效果 ，， ，，， ，按年统计质量手艺帮扶指标 ，， ，，， ，形成“诊断—实验—反响”全流程闭环。。。。 ？？？？鼓チ芳觳馐笛槭一シ眯卸 ，， ，，， ，通过龙头企业共享实验室、手艺机构提供专业检测效劳等方法 ，， ，，， ，为中小企业检测要害质料产品 ，， ，，， ，刷新生产工艺流程。。。。 。二是强化标准引领。。。。 。推动储能电池行业企业起劲开展标准对标达标活动 ，， ，，， ，起劲加入标准制修订。。。。 。个体行业企业加入制修订UL 9540、UL 9540A、UL 2743等多份国际标准 ，， ，，， ，加入海内标准化手艺委员会及协会组织20余个 ，， ，，， ，加入制修订GB 43854、GB 36672、GB 40559等50多项国家标准和行业标准。。。。 。三是品牌树模发动。。。。 。举行新能源领域首席质量官培训班 ，， ，，， ，推动企业质量品牌人才步队建设。。。。 ？？？？构ひ抵柿恐卫硌盗酚 ，， ，，， ，开设质量治理、流程理念和设计优化要领等治理实战课程 ，， ，，， ，累计培训300多人次 ，， ，，， ，宣布《生产装备治理规范》《变换治理实验规范》等整体标准规范 ，， ，，， ，解决中小企业工艺标准化水平低的问题。。。。 。四是优化知识产权效劳。。。。 。为龙头企业提供专利快速预审效劳 ，， ，，， ，发明专利由22个月缩短至3—6个月、适用新型专利由12个月缩短至1—2个月 ，， ，，， ，知识产权申请与结构时间本钱大幅缩减。。。。 。指导龙头企业逐步创开国家知识产权树模企业、优势企业 ，， ，，， ，坚持市场竞争优势。。。。 。优化知识产权维权效劳 ，， ，，， ，为链主企业提供行政、司法、仲裁、调解、磨练判断、公证、维权援助等效劳 ，， ，，， ，做好外洋知识产权纠纷应对指导效劳。。。。 。

帮扶效果：通过帮扶 ，， ，，， ，厦门市储能电池工业产品质量获得提升 ，， ，，， ，产品出厂自检及格率从98.2%提升至99.1% ，， ，，， ，客户投诉率同比下降32% ，， ，，， ，质量本钱占比下降1.8个百分点；；；；；8家行业企业通过ISO9001认证 ，， ，，， ，5家企业导入IATF 16949汽车行业质量治理系统；；；；；行业企业平均生产效率提升15% ，， ，，， ，制造本钱降低8% ，， ，，， ，预计2025年产值超500亿元。。。。 。

五、北京市市场羁系局深入推进产品质量可靠性立异实践

帮扶配景：产品质量可靠性是产品在划定的条件下和划定的时间内完成划定功效的能力 ，， ，，， ，是反应产品质量水平的焦点指标。。。。 。随着首都经济高质量生长和工业升级加速 ，， ，，， ，产品质量可靠性日益成为企业焦点竞争力之一 ，， ，，， ，《制造业可靠性提升实验意见》明确提出要围绕制造强国、质量强国战略目的 ，， ，，， ，聚焦机械、电子、汽车等重点行业 ，， ，，， ，对标国际同类产品先进水平 ，， ，，， ，提升整机装备可靠性水平。。。。 。在事情现实中发明 ，， ，，， ，部分企业仍然面临手艺基础薄弱、质量治理系统不完善、可靠性手艺应用缺乏、可靠性立异水平保存短板等问题。。。。 。

帮扶行动：北京市市场羁系局以提升企业产品质量可靠性立异水平为主线 ，， ，，， ，接纳“科普宣传+手艺平台+专家帮扶+培育清单”四位一体帮扶行动 ，， ，，， ，推动可靠性立异事情走深走实。。。。 。一是组织企业加入“产品质量可靠性公益大课堂” ，， ，，， ，连系一样平常羁系事情 ，， ，，， ，面向企业宣贯可靠性相关政策、宣讲可靠性科普知识。。。。 。二是建设北京市可靠性立异公共效劳平台 ，， ，，， ，增强手艺赋能 ，， ，，， ，开展产品质量可靠性相关手艺研究 ，， ，，， ，为北京市产品质量可靠性实践评选提供手艺支持。。。。 。三是建设北京市产品质量可靠性专家库 ，， ，，， ，充分验展行业专家在可靠性立异实践帮扶、典范选树等方面的起劲作用 ，， ，，， ，解决企业质量手艺难题。。。。 。四是选树可靠性培育清单 ，， ，，， ，增强与区局联动 ，， ，，， ，深入企业开展调研 ，， ，，， ，将辖区内新能源汽车、电子信息、仪器仪表、高端装备等具备一定可靠性基础的企业列入培育清单 ，， ，，， ，建设答疑机制 ，， ，，， ，为其提供产品质量可靠性事情指导。。。。 。

帮扶效果：建设首批2个可靠性立异公共效劳平台 ，， ，，， ，助推8家企业获得产品质量可靠性立异“最佳实践”典范案例 ，， ，，， ，1家企业获评FMEA(失效模式及影响剖析)应用典范案例 ，， ，，， ，有用施展发动引领作用 ，， ，，， ，助力推动产品质量由知足切合性向追求高可靠性转型。。。。 。

六、天津市市场羁系委帮扶某科技股份有限公司解决入口部件“卡脖子”问题

帮扶配景：某科技股份有限公司自建设以来 ，， ，，， ，一直专注于水下智能装备的研发、制造与销售。。。。 。随着国际形势的一直转变 ，， ，，， ，要害零部件的采购受制于外洋市场 ，， ，，， ，严重影响其水下智能装备的研发与生产。。。。 。

帮扶行动：一是综合剖析企业面临的问题及现状 ，， ，，， ，组织召开手艺钻研会 ，， ，，， ，开出“剖析建议书” ，， ，，， ，资助企业接纳高票鹄胧料和先进制造工艺 ，， ，，， ，确保；；；；到峁菇崾的陀 ，， ，，， ，同时设计中充分思量易损件的替换和维护 ，， ，，， ，降低维护本钱 ，， ，，， ，提高事情效率。。。。 。二是依托京津沪渝可靠性专家步队 ，， ，，， ，优选手艺精湛的专家 ，， ，，， ，开展质量手艺培训 ，， ，，， ，协助建设准确控制系统 ，， ，，， ，攻克先进传感器手艺 ，， ，，， ，实现在水下300米的严苛情形中对操作历程的高度准确控制。。。。 。三是运用京津沪渝可靠性公共效劳平台等先进磨练资源 ，， ，，， ，凭证差别的特殊应用场景及手艺要求 ，， ，，， ，资助企业开展产品测试验证。。。。 。

帮扶效果：通过帮扶 ，， ，，， ，该企业乐成突破外洋手艺封闭与入口产品限制 ，， ，，， ，实现了完全自主国产化替换。。。。 。2021年至今 ，， ，，， ，该企业荣获国家手艺发明奖二等奖、天津市科学手艺前进奖一等奖、国家知识产权优势企业称呼。。。。 。

七、安徽省马鞍山市市场羁系局帮帮助力某钢铁股份有限公司节本增效

帮扶配景：某钢铁股份有限公司是一家工业产品生产允许证获证企业 ，， ，，， ，主要生产钢筋混凝土用热轧带肋钢筋 ，， ，，， ，是安徽省主要修建用钢材生产基地。。。。 。近年来 ，， ，，， ，随着修建用钢筋产品市场需求一连走弱 ，， ，，， ，企业面临强烈的市场竞争 ，， ，，， ，加之产品合金本钱偏高、重量误差控制精度偏低等问题逐步展现 ，， ，，， ，直接影响了企业谋划效益。。。。 。

帮扶行动：一是优化合金因素 ，， ，，， ，降低冶炼本钱。。。。 。组织专家团队对修建用钢筋轧制用钢坯冶炼因素举行调解优化 ，， ，，， ，并对轧制的制品性能举行检测跟踪验证 ，， ，，， ，经由多轮试验和探索 ，， ，，， ，将硅锰合金和钒氮合金加入量划分降低至合理水平 ，， ，，， ，屈服强度性能指标稳固在430MPa—440MPa之间 ，， ，，， ，每吨钢降本约10元。。。。 。二是刷新轧制工艺 ，， ，，， ，提升吨材效益。。。。 。指导企业刷新轧制生产工艺 ，， ，，， ，优化产品外貌设计 ，， ，，， ，针对性培训重量误差控制手艺及检测手艺 ，， ，，， ，确保产品重量误差稳固控制在合理规模。。。。 。凭证3200元/吨钢材售价盘算 ，， ，，， ，重量误差每提升0.5% ，， ，，， ，钢材效益提升16元/吨。。。。 。三是提升检测能力 ，， ，，， ，严控产品质量。。。。 ？？？？共畋鹨蛩亍⑸ひ仗跫下显微组织的判别研究和系统性培训 ，， ，，， ，提升对判据要求的明确和自身检测能力 ，， ，，， ，严酷出厂磨练。。。。 。

睁开剩余80%

英国军情五处网站遭黑客攻击 被迫暂时关闭甘宇救援17日 4小时前 天津10月1日新增29例本土阳性熏染者 ，， ，，， ，均为管控职员辽宁省政协原副主席孙远良严重违纪违法被开除党籍晚间更新！天下现有高中危害区750+741个 ，， ，，， ，一图速览 12小时前 31省区市新增本土“106+526” 印尼球场骚乱致131死 ，， ，，， ，俱乐部老板：愿肩负所有责任美国务卿又向中国发来国庆祝贺 ，， ，，， ，比去年多了一句话北京丰台:新划定3个高危害区严冬将至：北溪疑云背后 德国能源危；；；；睦酚胂质 18分钟前 9月28日天津新增39例本土阳性熏染者江苏10月1日新增本土无症状熏染者1例 ，， ，，， ，为徐州市报告 7小时前 天下银行调高俄罗斯GDP预期顿涅茨克等四地区入俄条约正式生效 1分钟前 “刷脸”时代：怎样护脸又护财？？？？安徽10月2日新增无症状熏染者4例 “重大灾难”！“北溪”管道走漏 ，， ，，， ，将爆发灾难性影响北溪管道走漏 ，， ，，， ，将对欧洲能源带来四大影响山西昨日新增本土确诊病例7例 ，， ，，， ，新增无症状熏染者6例匈牙利总理：欧洲能源危；；；；枪д治决议造成的效果 6小时前 台媒：小S确诊新冠紧迫歇工 ，， ，，， ，节目暂停录制黑龙江9月30日新增本土“4+28” 31省区市新增本土“216＋1267” 下一位获得诺贝尔奖的华人 ，， ，，， ，可能是她？？？？河北三河市新增1例确诊病例 为高危害地区返回职员天下84地宣布“就地过节”政策 有这些转变对阵上海海港 ，， ，，， ，北京国安的防守不会只盯着武磊卡塔尔天下杯快来了 ，， ，，， ，义乌很忙天津昨日新增27例本土阳性熏染者 均为管控职员北京交警建议进京偏向车辆选择大广高速通行

宣布于：

声明：该文看法仅代表作者自己 ，， ，，， ，搜狐号系信息宣布平台 ，， ，，， ，搜狐仅提供信息存储空间效劳。。。。 。

阅读 (0)

网站地图

新闻

财经

娱乐

军事

体育

图库

汽车

房产

科技

时尚

小说

历史

用户反响相助

Copyright ? 2023 Sohu All Rights Reserved

搜狐公司 版权所有

【网站地图】